CREATE TABLE hyper (
  time BIGINT NOT NULL,
  device_id TEXT NOT NULL,
  sensor_1 NUMERIC NULL DEFAULT 1 CHECK (sensor_1 > 10)
);


SELECT * FROM create_hypertable('hyper', 'time', chunk_time_interval => 10);

--check and not-null constraints are inherited through regular inheritance.

\set ON_ERROR_STOP 0
INSERT INTO hyper(time, device_id,sensor_1) VALUES
(1257987700000000000, 'dev2', 9);

INSERT INTO hyper(time, device_id,sensor_1) VALUES
(1257987700000000000, NULL, 11);

\set ON_ERROR_STOP 1

INSERT INTO hyper(time, device_id,sensor_1) VALUES
(1257987700000000000, 'dev2', 11);

INSERT INTO hyper(time, device_id,sensor_1) VALUES
(1257987700000000000, 'dev2', 11);

----------------------- UNIQUE CONSTRAINTS ------------------

CREATE TABLE hyper_unique_with_looooooooooooooooooooooooooooooooooooong_name (
  time BIGINT NOT NULL UNIQUE,
  device_id TEXT NOT NULL,
  sensor_1 NUMERIC NULL DEFAULT 1 CHECK (sensor_1 > 10)
);


SELECT * FROM create_hypertable('hyper_unique_with_looooooooooooooooooooooooooooooooooooong_name', 'time', chunk_time_interval => 10);

INSERT INTO hyper_unique_with_looooooooooooooooooooooooooooooooooooong_name(time, device_id,sensor_1) VALUES
(1257987700000000000, 'dev2', 11);

INSERT INTO hyper_unique_with_looooooooooooooooooooooooooooooooooooong_name(time, device_id,sensor_1) VALUES
(1257987800000000000, 'dev2', 11);

\set ON_ERROR_STOP 0
INSERT INTO hyper_unique_with_looooooooooooooooooooooooooooooooooooong_name(time, device_id,sensor_1) VALUES
(1257987700000000000, 'dev2', 11);
\set ON_ERROR_STOP 1

-- Show constraints on main tables
SELECT * FROM _timescaledb_catalog.chunk_constraint;
SELECT * FROM test.show_constraints('hyper');
SELECT * FROM test.show_constraints('hyper_unique_with_looooooooooooooooooooooooooooooooooooong_name');
--should have unique constraint not just unique index
SELECT * FROM test.show_constraints('_timescaledb_internal._hyper_2_4_chunk');

ALTER TABLE hyper_unique_with_looooooooooooooooooooooooooooooooooooong_name DROP CONSTRAINT hyper_unique_with_looooooooooooooooooooooooooooooooooo_time_key;
-- The constraint should have been removed from the chunk as well
SELECT * FROM _timescaledb_catalog.chunk_constraint;
SELECT * FROM test.show_constraints('_timescaledb_internal._hyper_2_4_chunk');

--uniqueness not enforced
INSERT INTO hyper_unique_with_looooooooooooooooooooooooooooooooooooong_name(time, device_id,sensor_1) VALUES
(1257987700000000000, 'dev3', 11);

--shouldn't be able to create constraint
\set ON_ERROR_STOP 0
ALTER TABLE hyper_unique_with_looooooooooooooooooooooooooooooooooooong_name ADD CONSTRAINT hyper_unique_time_key UNIQUE (time);
\set ON_ERROR_STOP 1

DELETE FROM hyper_unique_with_looooooooooooooooooooooooooooooooooooong_name WHERE device_id = 'dev3';

-- Try multi-alter table statement with a constraint without a name
ALTER TABLE hyper_unique_with_looooooooooooooooooooooooooooooooooooong_name
      ADD CHECK (time > 0),
      ADD UNIQUE (time);

SELECT * FROM _timescaledb_catalog.chunk_constraint;
SELECT * FROM test.show_constraints('hyper_unique_with_looooooooooooooooooooooooooooooooooooong_name');
SELECT * FROM test.show_constraints('_timescaledb_internal._hyper_2_4_chunk');

ALTER TABLE  hyper_unique_with_looooooooooooooooooooooooooooooooooooong_name
DROP CONSTRAINT hyper_unique_with_looooooooooooooooooooooooooooooooooo_time_key,
DROP CONSTRAINT hyper_unique_with_looooooooooooooooooooooooooooooooo_time_check;

SELECT * FROM _timescaledb_catalog.chunk_constraint;
SELECT * FROM test.show_constraints('hyper_unique_with_looooooooooooooooooooooooooooooooooooong_name');
SELECT * FROM test.show_constraints('_timescaledb_internal._hyper_2_4_chunk');

CREATE UNIQUE INDEX hyper_unique_with_looooooooooooooooooooooooooooooooo_time_idx
ON hyper_unique_with_looooooooooooooooooooooooooooooooooooong_name (time);

\set ON_ERROR_STOP 0
-- Try adding constraint using existing index
ALTER TABLE hyper_unique_with_looooooooooooooooooooooooooooooooooooong_name
ADD CONSTRAINT hyper_unique_with_looooooooooooooooooooooooooooooooooo_time_key UNIQUE
USING INDEX hyper_unique_with_looooooooooooooooooooooooooooooooo_time_idx;
\set ON_ERROR_STOP 1
DROP INDEX hyper_unique_with_looooooooooooooooooooooooooooooooo_time_idx;

--now can create
ALTER TABLE  hyper_unique_with_looooooooooooooooooooooooooooooooooooong_name
ADD CONSTRAINT hyper_unique_with_looooooooooooooooooooooooooooooooooo_time_key UNIQUE (time);
SELECT * FROM test.show_constraints('_timescaledb_internal._hyper_2_4_chunk');

--test adding constraint with same name to different table -- should fail
\set ON_ERROR_STOP 0
ALTER TABLE hyper
ADD CONSTRAINT hyper_unique_with_looooooooooooooooooooooooooooooooooo_time_key UNIQUE (time);
\set ON_ERROR_STOP 1

--uniquness violation fails
\set ON_ERROR_STOP 0
INSERT INTO hyper_unique_with_looooooooooooooooooooooooooooooooooooong_name(time, device_id,sensor_1)
VALUES (1257987700000000000, 'dev2', 11);
\set ON_ERROR_STOP 1

--cannot create unique constraint on non-partition column
\set ON_ERROR_STOP 0
ALTER TABLE hyper_unique_with_looooooooooooooooooooooooooooooooooooong_name
ADD CONSTRAINT hyper_unique_invalid UNIQUE (device_id);
\set ON_ERROR_STOP 1


----------------------- PRIMARY KEY  ------------------

CREATE TABLE hyper_pk (
  time BIGINT NOT NULL PRIMARY KEY,
  device_id TEXT NOT NULL,
  sensor_1 NUMERIC NULL DEFAULT 1 CHECK (sensor_1 > 10)
);


SELECT * FROM create_hypertable('hyper_pk', 'time', chunk_time_interval => 10);

INSERT INTO hyper_pk(time, device_id,sensor_1) VALUES
(1257987700000000000, 'dev2', 11);

\set ON_ERROR_STOP 0
INSERT INTO hyper_pk(time, device_id,sensor_1) VALUES
(1257987700000000000, 'dev2', 11);
\set ON_ERROR_STOP 1

--should have unique constraint not just unique index
SELECT * FROM test.show_constraints('_timescaledb_internal._hyper_3_6_chunk');

ALTER TABLE hyper_pk DROP CONSTRAINT hyper_pk_pkey;
SELECT * FROM test.show_constraints('_timescaledb_internal._hyper_3_6_chunk');

--uniqueness not enforced
INSERT INTO hyper_pk(time, device_id,sensor_1) VALUES
(1257987700000000000, 'dev3', 11);


--shouldn't be able to create pk
\set ON_ERROR_STOP 0
ALTER TABLE hyper_pk ADD CONSTRAINT hyper_pk_pkey PRIMARY KEY (time);
\set ON_ERROR_STOP 1

DELETE FROM hyper_pk WHERE device_id = 'dev3';

--cannot create pk constraint on non-partition column
\set ON_ERROR_STOP 0
ALTER TABLE hyper_pk ADD CONSTRAINT hyper_pk_invalid PRIMARY KEY (device_id);
\set ON_ERROR_STOP 1

--now can create
ALTER TABLE hyper_pk ADD CONSTRAINT hyper_pk_pkey PRIMARY KEY (time);
SELECT * FROM test.show_constraints('_timescaledb_internal._hyper_3_6_chunk');

--test adding constraint with same name to different table -- should fail
\set ON_ERROR_STOP 0
ALTER TABLE hyper ADD CONSTRAINT hyper_pk_pkey UNIQUE (time);
\set ON_ERROR_STOP 1

--uniquness violation fails
\set ON_ERROR_STOP 0
INSERT INTO hyper_pk(time, device_id,sensor_1) VALUES
(1257987700000000000, 'dev2', 11);
\set ON_ERROR_STOP 1


----------------------- FOREIGN KEY  ------------------

CREATE TABLE devices(
    device_id TEXT NOT NULL,
    PRIMARY KEY (device_id)
);

CREATE TABLE hyper_fk (
  time BIGINT NOT NULL PRIMARY KEY,
  device_id TEXT NOT NULL REFERENCES devices(device_id),
  sensor_1 NUMERIC NULL DEFAULT 1 CHECK (sensor_1 > 10)
);


SELECT * FROM create_hypertable('hyper_fk', 'time', chunk_time_interval => 10);

--fail fk constraint
\set ON_ERROR_STOP 0
INSERT INTO hyper_fk(time, device_id,sensor_1) VALUES
(1257987700000000000, 'dev2', 11);
\set ON_ERROR_STOP 1

INSERT INTO devices VALUES ('dev2');

INSERT INTO hyper_fk(time, device_id,sensor_1) VALUES
(1257987700000000000, 'dev2', 11);

--delete should fail
\set ON_ERROR_STOP 0
DELETE FROM devices;
\set ON_ERROR_STOP 1

ALTER TABLE hyper_fk DROP CONSTRAINT hyper_fk_device_id_fkey;

--should now be able to add non-fk rows
INSERT INTO hyper_fk(time, device_id,sensor_1) VALUES
(1257987700000000001, 'dev3', 11);

--can't add fk because of dev3 row
\set ON_ERROR_STOP 0
ALTER TABLE hyper_fk ADD CONSTRAINT hyper_fk_device_id_fkey
FOREIGN KEY (device_id) REFERENCES devices(device_id);
\set ON_ERROR_STOP 1

DELETE FROM hyper_fk WHERE device_id = 'dev3';

ALTER TABLE hyper_fk ADD CONSTRAINT hyper_fk_device_id_fkey
FOREIGN KEY (device_id) REFERENCES devices(device_id);

\set ON_ERROR_STOP 0
INSERT INTO hyper_fk(time, device_id,sensor_1) VALUES
(1257987700000000002, 'dev3', 11);
\set ON_ERROR_STOP 1

----------------------- FOREIGN KEY INTO A HYPERTABLE  ------------------


--FOREIGN KEY references into a hypertable are currently broken.
--The referencing table will never find the corresponding row in the hypertable
--since it will only search the parent. Thus any insert will result in an ERROR
--TODO: block such foreign keys or fix. (Hard to block on create table so punting for now)
CREATE TABLE hyper_for_ref (
  time BIGINT NOT NULL PRIMARY KEY,
  device_id TEXT NOT NULL,
  sensor_1 NUMERIC NULL DEFAULT 1 CHECK (sensor_1 > 10)
);

SELECT * FROM create_hypertable('hyper_for_ref', 'time', chunk_time_interval => 10);

\set ON_ERROR_STOP 0
CREATE TABLE referrer (
    time BIGINT NOT NULL REFERENCES hyper_for_ref(time)
);
\set ON_ERROR_STOP 1

CREATE TABLE referrer2 (
   time BIGINT NOT NULL
);

\set ON_ERROR_STOP 0
ALTER TABLE referrer2 ADD CONSTRAINT hyper_fk_device_id_fkey
FOREIGN KEY (time) REFERENCES  hyper_for_ref(time);
\set ON_ERROR_STOP 1

----------------------- EXCLUSION CONSTRAINT  ------------------

CREATE TABLE hyper_ex (
    time BIGINT,
    device_id TEXT NOT NULL REFERENCES devices(device_id),
    sensor_1 NUMERIC NULL DEFAULT 1 CHECK (sensor_1 > 10),
    canceled boolean DEFAULT false,
    EXCLUDE USING btree (
        time WITH =, device_id WITH =
    ) WHERE (not canceled)
);

SELECT * FROM create_hypertable('hyper_ex', 'time', chunk_time_interval=>_timescaledb_internal.interval_to_usec('1 month'));

INSERT INTO hyper_ex(time, device_id,sensor_1) VALUES
(1257987700000000000, 'dev2', 11);

\set ON_ERROR_STOP 0
INSERT INTO hyper_ex(time, device_id,sensor_1) VALUES
(1257987700000000000, 'dev2', 12);
\set ON_ERROR_STOP 1

ALTER TABLE hyper_ex DROP CONSTRAINT hyper_ex_time_device_id_excl;

--can now add
INSERT INTO hyper_ex(time, device_id,sensor_1) VALUES
(1257987700000000000, 'dev2', 12);

--cannot add because of conflicts
\set ON_ERROR_STOP 0
ALTER TABLE hyper_ex ADD CONSTRAINT hyper_ex_time_device_id_excl
    EXCLUDE USING btree (
        time WITH =, device_id WITH =
    ) WHERE (not canceled)
;
\set ON_ERROR_STOP 1

DELETE FROM hyper_ex WHERE sensor_1 = 12;

ALTER TABLE hyper_ex ADD CONSTRAINT hyper_ex_time_device_id_excl
    EXCLUDE USING btree (
        time WITH =, device_id WITH =
    ) WHERE (not canceled)
;

\set ON_ERROR_STOP 0
INSERT INTO hyper_ex(time, device_id,sensor_1) VALUES
(1257987700000000000, 'dev2', 12);
\set ON_ERROR_STOP 1


--cannot add exclusion constraint without partition key.
CREATE TABLE hyper_ex_invalid (
    time BIGINT,
    device_id TEXT NOT NULL REFERENCES devices(device_id),
    sensor_1 NUMERIC NULL DEFAULT 1 CHECK (sensor_1 > 10),
    canceled boolean DEFAULT false,
    EXCLUDE USING btree (
        device_id WITH =
    ) WHERE (not canceled)
);

\set ON_ERROR_STOP 0
SELECT * FROM create_hypertable('hyper_ex_invalid', 'time', chunk_time_interval=>_timescaledb_internal.interval_to_usec('1 month'));
\set ON_ERROR_STOP 1
