-- Defines error codes used
-- PREFIX IO

-- IO000 - GROUP: query errors
-- IO001 - hypertable does not exist
-- IO002 - column does not exist

--IO100 - GROUP: DDL errors
--IO101 - operation not supported
--IO102 - no partitioning column for hypertable
--IO103 - unknown index type
--IO104 - illegal name/identifier
--IO110 - hypertable already exists

--IO500 - GROUP: internal error
--IO501 - unexpected state/event
--IO502 - communication/remote error
